LABEL = "string";                 Specify main label

The LABEL parameter specifies a string of ASCII characters to use as
the main label on plots, in the header line for printed output, and in
the Header record for files generated by the WRITE procedure.  The
string of characters must be surrounded by double quote characters ("). 
DAN has no mechanism for including double quote characters in the
label.
